\documentclass[a4paper,11pt]{article}
\usepackage{graphicx}
%\usepackage{url}
%%
%%   VARIABLE HEIGHT FOR THE TITLE BOX (default 35mm)
%%

%\setlength{\titleblockheight}{27mm}

\setlength{\topmargin}{-1.9cm}
\setlength{\textheight}{26cm}
\setlength{\oddsidemargin}{-0.8cm}
\setlength{\textwidth}{17.5cm}


\begin{document}
\pagestyle{empty}
\Large
\begin{center}
{\bf  An Abstract for the Workshop}
\normalsize

\vspace{0.4cm}
J. Lastname$^1$, K. Musterfrau$^1$, C. Mustermann$^2$

$^1$GSI, Darmstadt, Germany; $^2$ITEP Moscow, Russia
\end{center}
\begin{center}
\vspace{0.2cm}
\normalsize
{\bf Submission of Abstracts}
\end{center}
\normalsize

Templates are provided for Microsoft Word and LaTeX, authors must use these and should not change the templates, for example using different fonts and fontsizes.  Abstracts should not exceed 1 page.  Each author should submit also a PDF-file of the abstract but at least all of the source files.

\vspace{0.2cm}
\noindent{\it Author List}
\smallskip

The name of the submitting author - if also the presenter of the talk or poster at the workshop - should appear first, followed by the co-authors in alphabetical order. In  a separate line the affiliations of the authors should be listed.

\vspace{0.2cm}
\noindent{\it Section Headings and Paragraph Text}
\smallskip

Section headlines should not be numbered. They should use 11pt bold  letters and be centered.  Subsection headlines should be 11 pt italic and justified to the left side. Text in the parapgraphs should use 11pt font and be justified to both sides. Indents at the beginning should be $\approx$~ 3 mm.

\vspace{0.2cm}
\noindent{\it Equations}
\smallskip

If a displayed equation needs a number, place it flush with the right margin of the column
(see Equation 1).
\medskip
\begin{equation}\label{eq:units}
C_B={q^3\over 3\epsilon_{0} mc}=3.54\,\hbox{$\mu$eV/T}
\end{equation}

\vspace{0.2cm}
\noindent{\it Figures}
\smallskip

All figures and tables must be  numbered and have captions (11 pt font) placed below figures and above tables. One line captions  should be centred, otherwise justified to the left side.
\smallskip
\begin{figure}[htb]
\centering
\includegraphics[width=80mm]{PP_11_07_16.eps}
\caption{example picture}
\label{l2ea4-f1}
\end{figure}
%\vspace{5.0cm}

\noindent{\it Page Numbers}
\smallskip

DO NOT include any page numbers 

\begin{thebibliography}{9}   % Use for  1-9  references
%\begin{thebibliography}{99} % Use for 10-99 references

\bibitem{accelconf-ref}
C. Petit-Jean-Genaz and J. Poole, ``JACoW, A service to the Accelerator Community'',
EPAC'04, July 2004, Lucerne, p.~249, http://www.JACoW.org.

\bibitem{jacow-help} A. Name and D. Person, Modern Editor's Journal 25
(1997) 56


\end{thebibliography}

\end{document} 
